Title: BC - Foundations of Math and Pre-Calculus 10 - 1.0

Teacher Resources
  StudyForge Math Course Guide
  Foundations of Math and Pre-Calculus 10 Scope and Sequence (PDF)
  Foundations of Math and Pre-Calculus 10 Scope and Sequence (DOCX)
Chapter 1 - Exponents
  Lesson 1: Factors of Whole Numbers
  Lesson 2: Perfect Squares and Perfect Cubes
  Lesson 3: Exponent Rules
  Lesson 4: Negative Exponents
  Exponents Note Package and Practice Questions Hand In Box
  Exponents Mastery Assignment (PDF)
  Exponents Mastery Assignment (DOCX)
  Exponents Mastery Assignment Answer Key (PDF)
  Exponents Mastery Assignment Answer Key (DOCX)
  Exponents Mastery Assignment Hand In Box
  Exponents Test Worksheet (PDF)
  Exponents Test Worksheet (DOCX)
Chapter 1 Exponents Test
  Exponents Chapter Test
Chapter 2 - Polynomials
  Lesson 1: Defining Polynomials
  Lesson 2: Area Models
  Lesson 3: Multiplying Polynomials
  Lesson 4: Basic Factoring
  Lesson 5: Factoring Trinomials and Difference of Squares
  Poynomials Note Package and Practice Questions Hand In Box
  Polynomials Mastery Assignment (PDF)
  Polynomials Mastery Assignment (DOCX)
  Polynomials Mastery Assignment Answer Key (PDF)
  Polynomials Mastery Assignment Answer Key (DOCX)
  Polynomials Mastery Assignment Hand In Box
  Polynomials Test Worksheet (PDF)
  Polynomials Test Worksheet (DOCX)
Chapter 2 Polynomials Test
  Polynomials Chapter Test
Chapter 3 - Functions and Relations
  Lesson 1: Review of the Coordinate Plane and Relating Data
  Lesson 2: Interpreting Graphs
  Lesson 3: Domain and Range
  Lesson 4: Functions
  Lesson 5: Applications of Functions
  Functions and Relations Note Package and Practice Questions Hand In Box
  Functions and Relations Mastery Assignment (PDF)
  Functions and Relations Mastery Assignment (DOCX)
  Functions and Relations Mastery Assignment Answer Key (PDF)
  Functions and Relations Mastery Assignment Answer Key (DOCX)
  Functions and Relations Mastery Assignment Hand In Box
  Functions and Relations Test Worksheet (PDF)
  Functions and Relations Test Worksheet (DOCX)
Chapter 3 Functions and Relations Test
  Functions and Relations Chapter Test
Chapter 4 - Linear Relations
  Lesson 1: Slope
  Lesson 2: Slope Intercept Form
  Lesson 3: General and Point Slope Form
  Lesson 4: Functions
  Lesson 5: Arithmetic Sequences
  Lesson 6: Arithmetic Series
  Linear Relations Note Package and Practice Questions Hand In Box
  Linear Relations Mastery Assignment (PDF)
  Linear Relations Mastery Assignment (DOCX)
  Linear Relations Mastery Assignment Answer Key (PDF)
  Linear Relations Mastery Assignment Answer Key (DOCX)
  Linear Relations Mastery Assignment Hand In Box
  Linear Relations Test Worksheet (PDF)
  Linear Relations Mastery Assignment (DOCX)
Chapter 4 Linear Relations Test
  Linear Relations Chapter Test
Chapter 5 - Systems of Equations
  Cheaper to Fly or Drive - Systems of Equations Project Outline (PDF)
  Cheaper to Fly or Drive - Systems of Equations Project Outline (DOCX)
  Cheaper to Fly or Drive - Systems of Equations Project Teacher Guide (PDF)
  Cheaper to Fly or Drive - Systems of Equations Project Teacher Guide (DOCX)
  Cheaper to Fly or Drive - Project Hand in Box
  Lesson 1: Solving Graphically
  Lesson 2: Solve by Substitution
  Lesson 3: Solve by Elimination
  Lesson 4: Applications of Linear Systems
  Systems of Equation Note Package and Practice Questions Hand In Box
  Systems of Equations Mastery Assignment (PDF)
  Systems of Equations Mastery Assignment (DOCX)
  Systems of Equations Mastery Assignment Answer Key (PDF)
  Systems of Equations Mastery Assignment Answer Key (DOCX)
  Systems of Equations Mastery Assignment
  Systems of Equations Test Worksheet (PDF)
  Systems of Equations Test Worksheet (DOCX)
Chapter 5 Systems of Equations Test
  Systems of Equations Chapter Test
Chapter 6 - Trigonometry
  Trigonometry Project Outline (PDF)
  Trigonometry Project Outline (DOCX)
  Trigonometry Project Teacher Guide (PDF)
  Trigonometry Project Teacher Guide (DOCX)
  Trigonometry Project Hand in Box
  Lesson 1: Trigonometry Review
  Lesson 2: The Three Ratios
  Lesson 3: Steps to Finding Sides and Angles
  Lesson 4: Solving Triangles
  Lesson 5: Applications of Solving Triangles
  Trigonometry Note Package and Practice Questions Hand In Box
  Trigonometry Mastery Assignment (PDF)
  Trigonometry Mastery Assignment (DOCX)
  Trigonometry Mastery Assignment Answer Key (PDF)
  Trigonometry Mastery Assignment Answer Key (DOCX)
  Trigonometry Mastery Assignment Hand In Box
  Trigonometry Test Worksheet (PDF)
  Trigonometry Test Worksheet (DOCX)
Chapter 6 Trigonometry Test
  Trigonometry Chapter Test
Chapter 7 - Financial Literacy
  Commission Sales - Financial Literacy Project (PDF)
  Commission Sales - Financial Literacy Project (DOCX)
  Financial Literacy Project - Interview Document (PDF)
  Financial Literacy Project - Interview Document (DOCX)
  Commission Sales - Financial Literacy Project Hand In Box
  Lesson 1: Wages
  Lesson 2: Salary
  Lesson 3: Piecework
  Lesson 4: Commission
  Lesson 5: Income Tax and Deductions
  Financial Literacy Note Package and Practice Questions Hand In Box
  Commission Sales - Financial Literacy Project Teacher Guide (PDF)
  Commission Sales - Financial Literacy Project Teacher Guide (DOCX)
  Financial Literacy Mastery Assignment (PDF)
  Financial Literacy Mastery Assignment (DOCX)
  Financial Literacy Mastery Assignment Answer Key (PDF)
  Financial Literacy Mastery Assignment Answer Key (DOCX)
  Financial Literacy Mastery Assignment Hand In Box
  Financial Literacy Test Worksheet
Chapter 7 Financial Literacy
  Financial Literacy Chapter Test
Final Exam
  Final Exam Worksheet (PDF)
  Final Exam Worksheet (DOCX)
  Final Exam